en	Authentication required
sv-se	Autentisering krävs

en	Username
sv-se	Användarnamn

en	Password
sv-se	Lösenord

en	New password
sv-se	Nytt lösenord

en	Login
sv-se	Logga in

en	Logout
sv-se	Logga ut

en	Update
sv-se	Uppdatera

en	Submit
sv-se	Sänd

en	The configuration type "{0}" was not found. Only the following configuration types are supported: "{1}"