en	Authentication required
pt-br	Autenticação necessária

en	Username
pt-br	Nome de Usuário

en	Password
pt-br	Senha

en	New password
pt-br	Nova senha

en	Login
pt-br	Conectar

en	Logout
pt-br	Sair

en	Update
pt-br	Atualizar

en	Submit
pt-br	Enviar

en	The configuration type "{0}" was not found. Only the following configuration types are supported: "{1}"