en	Authentication required
no	Innlogging er påkrevet

en	Username
no	Brukernavn

en	Password
no	Passord

en	New password
no	Nytt passord

en	Login
no	Logg inn

en	Logout
no	Logg ut

en	Update
no	Oppdater

en	Submit
no	Send

en	The configuration type "{0}" was not found. Only the following configuration types are supported: "{1}"