en	Authentication required
id	Otentikasi Diperlukan

en	Username
id	Nama Pengguna

en	Password
id	Kata sandi

en	New password
id	Kata sandi baru

en	Login
id	Masuk

en	Logout
id	Keluar

en	Update
id	Pembaruan

en	Submit
id	Kirim

en	The configuration type "{0}" was not found. Only the following configuration types are supported: "{1}"