en	Authentication required
da	Autentificering kræves

en	Username
da	Brugernavn

en	Password
da	Adgangskode

en	New password
da	Ny adgangskode

en	Login
da	Log ind

en	Logout
da	Log ud

en	Update
da	Opdater

en	Submit
da	Indsend

en	The configuration type "{0}" was not found. Only the following configuration types are supported: "{1}"