en	The username is already in use.
zh-cn	用户名已存在

en	The hostname "{0}" was not valid.
zh-cn	非法主机"{0}"

en	The given password was empty.
zh-cn	密码为空

en	The passwords did not match.
zh-cn	密码不匹配。