en	The username is already in use.
sv-se	Användarnamnet används redan.

en	The hostname "{0}" was not valid.
sv-se	Hostname "{0}" var ej giltigt.

en	The given password was empty.
sv-se	Lösenordet var tomt.

en	The passwords did not match.
sv-se	Lösenorden matchade ej.